bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.004 / 3

Constant 3.603e+05 ± 9.334e+04 Mean 0.3258 ± -1.628 Sigma 0.3392 ± 0.3889

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.2325 / 4 Constant 1.003 ± 3.364 Mean 0.03322 ± 0.1765 Sigma 0.04836 ± 0.08081

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.5986 / 4 Constant 1.444 ± 4.684 Mean 0.009793 ± 0.1901 Sigma 0.01061 ± 0.03672

0

1

2

3

4

5 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.2374 / 4 Constant 1.436 ± 5.694 Mean 0.01117 ± 0.1878 Sigma 0.009828 ± 0.04198

0 1 2 3 4 5 6 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.176 / 4 Constant 1.509 ± 5.449 Mean 0.007841 ± 0.1746 Sigma 0.007102 ± 0.03305

0 1 2 3 4 5 6 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.97 / 5 Constant 1.757 ± 7.311 Mean 0.01105 ± 0.1713 Sigma 0.01086 ± 0.04589

0

2

4

6

8

10 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.772 / 6 Constant 1.428 ± 5.555 Mean 0.01106 ± 0.1833 Sigma 0.01404 ± 0.05047

0 1 2 3 4 5 6 7 8 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.184 / 5 Constant 2.213 ± 9.553 Mean 0.005138 ± 0.1638 Sigma 0.004705 ± 0.02793

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.725 / 5 Constant 1.691 ± 5.987 Mean 0.008272 ± 0.1598 Sigma 0.009677 ± 0.03702

0 1 2 3 4 5 6 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.989 / 6 Constant 2.068 ± 9.494 Mean 0.005205 ± 0.1549 Sigma 0.004486 ± 0.03046

0

2

4

6

8

10 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.803 / 6 Constant 1.623 ± 4.932 Mean 0.008459 ± 0.1661 Sigma 0.01104 ± 0.03821

0 1 2 3 4 5 6 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.79 / 5 Constant 1.765 ± 6.351 Mean 0.01206 ± 0.1586 Sigma 0.01245 ± 0.04203

0 1 2 3 4 5 6 7 8 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:42:14 2003