bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.1042 / 1

Constant 2.972e+05 ± 1.015e+05 Mean 0.1362 ± -0.8072 Sigma 0.1755±

0.2138

0 0.5 1 1.5 2 2.5 3 ± ± (real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.866 / 2 Constant 58.14 ± 8.348 Mean 1.217 ± 0.6836 Sigma 0.2794 ± 0.2925

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.05145 / 3 Constant 0.7872 ± 2.135 Mean 0.06657 ± 0.1946 Sigma 0.07561 ± 0.07182

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.407 / 4 Constant 1.258 ± 3.826 Mean 0.01053 ± 0.193 Sigma 0.01068 ± 0.03655

0 1 2 3 4 5 6 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.516 / 3 Constant 2.007 ± 4.451 Mean 0.01119 ± 0.2041 Sigma 0.01711 ± 0.03913

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.488 / 3 Constant 0.9347 ± 2.815 Mean 0.03621 ± 0.1642 Sigma 0.03887 ± 0.05876

0

1

2

3

4

5 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.332 / 3 Constant 0.5733 ± 1.955 Mean 1.266 ± 0.1838 Sigma 0.3591 ± 0.4113

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.3137 / 3 Constant 1.5±

2.777 Mean 0.01315 ± 0.1583 Sigma 0.01876 ± 0.03837

0 0.5 1 1.5 2 2.5 3 ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.9301 / 1 Constant 3.805 ± 12.88 Mean 0.003207 ± 0.1647 Sigma 0.003065 ± 0.01332

0 2 4 6 8 10 12 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.315 / 2 Constant 4.216 ± 10.8 Mean 0.007084 ± 0.1702 Sigma 0.01011 ± 0.02124

0 2 4 6 8 10 12 14 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.07719 / 2 Constant 2.401 ± 5.152 Mean 0.06411 ± 0.1476 Sigma 0.03769 ± 0.04495

0

1

2

3

4

5 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.4013 / 3 Constant 1.086 ± 3.209 Mean 0.02204 ± 0.1691 Sigma 0.0263 ± 0.04949

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 16:24:49 2003