bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.803e-11 / 0 Constant 2.042 ± 4.117 Mean 0.00578 ± 0.1733 Sigma 0.005259 ± 0.01387

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.003083 / 0 Constant 5.864e+04 ± 3956 Mean 0.8161 ± 1.04 Sigma 0.1939 ± 0.2134

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.965 / 2 Constant 2.072 ± 3.942 Mean 0.005114 ± 0.1901 Sigma 0.004261 ± 0.01224

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.8633 / 2 Constant 1.943 ± 3.797 Mean 0.00675 ± 0.2018 Sigma 0.008301 ± 0.01946

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.778 / 1 Constant 3061 ± 221.2 Mean 1.393 ± 1.207 Sigma 0.1581 ± 0.3152

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.3828 / 1 Constant 127.8 ± 14.39 Mean 2.214 ± 0.637 Sigma 0.3312 ± 0.2394

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.7142 / 2 Constant 1.45e+04 ± 1500 Mean 0.7955 ± 1.288 Sigma 0.2922 ± 0.2993

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.3899 / 2 Constant 1.666 ± 4.519 Mean 0.0119 ± 0.1895 Sigma 0.009105 ± 0.03415

0

1

2

3

4

5 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.396 / 2 Constant 278.6 ± 18.99 Mean 2.098 ± -0.4901 Sigma 0.2182 ± 0.3107

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.583 / 4 Constant 38.29 ± 7.58 Mean 1.091 ± 0.4269 Sigma 0.2861 ± 0.1672

0 1 2 3 4 5 6 7 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.7533 / 2 Constant 1.291 ± 1.751 Mean 0.05141 ± 0.1905 Sigma 0.1157 ± 0.07258

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.429 / 4 Constant 1.3±

3.019 Mean 0.02072 ± 0.1643 Sigma 0.02718 ± 0.04264

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ±

(real) for eta bin 11 γγM

Mon Jul 7 16:25:01 2003