bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.561e-11 / -1 Constant 18.2±

2.484 Mean 0.05682 ± 0.1966 Sigma 0.07899 ± 0.009961

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.995e-12 / -1 Constant 14.33 ± 2.292 Mean 0.1576 ± 0.2385 Sigma 0.1726 ± 0.02211

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 2.154e-10 / 0 Constant 1.553 ± 3.156 Mean 0.04026 ± 0.24 Sigma 0.04944 ± 0.03141

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.307e-10 / -1 Constant 25.74 ± 4.969 Mean 0.0402 ± 0.2434 Sigma 0.06032 ± 0.009961

0 0.5 1 1.5 2 2.5 3 3.5 4 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.372 / 2 Constant 0.723 ± 1.663 Mean 0.2457 ± 0.2161 Sigma 0.207 ± 0.1114

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 6.4e-05 / 1 Constant 0.5029 ± 1.005 Mean 1.123 ± 0.22 Sigma 0.1285 ± 0.2236

0

0.2

0.4

0.6

0.8

1 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.429e-13 / -1 Constant 16.77 ± 1.499 Mean 0.008726 ± 0.18 Sigma 0.08156 ± 0.01111

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.3424 / 1 Constant 33.39 ± 3.825 Mean 2.968 ± 0.9669 Sigma 0.3154 ± 0.5215

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.608e-16 / -1 Constant 15.44 ± 1.381 Mean 0.0219 ± 0.23 Sigma 0.1071 ± 0.0249

0

0.2

0.4

0.6

0.8

1 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.568 / 1 Constant 1.225 ± 2.245 Mean 0.05691 ± 0.1775 Sigma 0.05316 ± 0.03437

0 0.5 1 1.5 2 2.5 3 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 1.429e-13 / -1 Constant 16.77 ± 1.499 Mean 0.008726 ± 0.18 Sigma 0.08156 ± 0.01111

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 0.152 / 0

Constant 1.916e+08 ± 1.288e+07

Mean 1.092±

2.53 Sigma 0.24±

0.4118

0 0.5 1 1.5 2 2.5 3 ± (real) for eta bin 11 γγM

Mon Jul 7 16:25:11 2003