bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 15.96 / 7 Constant 7.049 ± 39.27 Mean 0.03921 ± 0.07345 Sigma 0.02898 ± 0.05897

-20 0

20 40

60 80 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.999 / 7 Constant 84.31 ± 46.48 Mean 0.1821 ± 0.03556 Sigma 0.07513 ± 0.05189

-40 -20 0 20 40 60 80 100 ± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.506 / 7 Constant 10.8±

53.42 Mean 0.005952 ± 0.103 Sigma 0.007566 ± 0.02642

-40 -20 0 20 40 60 80 100 ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.901 / 7 Constant 9.227 ± 51.24 Mean 0.007453 ± 0.1291 Sigma 0.007947 ± 0.03664

-20 0 20 40 60 80 100 120 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.327 / 7 Constant 10.63 ± 88.92 Mean 0.004211 ± 0.1264 Sigma 0.003613 ± 0.03143

-50

0

50

100

150

± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 5.579 / 7 Constant 9.91±

67.98 Mean 0.005658 ± 0.1301 Sigma 0.004722 ± 0.03391

-50

0

50

100

150 ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.557 / 7 Constant 10.02 ± 54.64 Mean 0.006933 ± 0.1326 Sigma 0.007082 ± 0.03534

-40 -20 0 20 40 60 80 100 120 140 ± ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 7.584 / 7 Constant 8.089 ± 41.76 Mean 0.008178 ± 0.1381 Sigma 0.009515 ± 0.04082

-20 0 20 40 60 80 100 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 8.51 / 7 Constant 7.514 ± 55.2 Mean 0.005628 ± 0.1651 Sigma 0.004537 ± 0.03526

-20 0 20 40 60 80 100 ± ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 4.86 / 7 Constant 6.07±

35.59 Mean 0.008532 ± 0.1451 Sigma 0.007429 ± 0.04239

-20

0

20

40

60

80 ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 3.709 / 7 Constant 5.4±

21.71 Mean 0.01288 ± 0.155 Sigma 0.01186 ± 0.04675

-20

0

20

40

60 ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 12.25 / 7 Constant 5.544 ± 30.24 Mean 0.00809 ± 0.1451 Sigma 0.009096 ± 0.04269

-20

0

20

40

60 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:49:49 2003