bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 73.74 / 7 Constant 24.95 ± 540.1 Mean 0.001562 ± 0.1372 Sigma 0.001353 ± 0.02807

-100 0 100 200 300 400 500 600 700 800 ± ± ±

(real) for eta bin 0 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 68.44 / 7 Constant 26.74 ± 567.6 Mean 0.001594 ± 0.1508 Sigma 0.001292 ± 0.027

0

200

400

600

800

± ± ±

(real) for eta bin 1 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 71.37 / 7 Constant 27.93 ± 841.7 Mean 0.001247 ± 0.1572 Sigma 0.001026 ± 0.03209

0 200 400 600 800 1000

1200 ± ± ±

(real) for eta bin 2 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 51.91 / 7 Constant 26.43 ± 594.1 Mean 0.001776 ± 0.1641 Sigma 0.001585 ± 0.03327

0

200

400

600 800

1000 ± ± ±

(real) for eta bin 3 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 69.29 / 7 Constant 26.07 ± 620.2 Mean 0.001888 ± 0.1738 Sigma 0.00161 ± 0.03711

-200 0 200 400 600 800 1000

1200 ± ± ±

(real) for eta bin 4 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 25.35 / 7 Constant 23.95 ± 470 Mean 0.002421 ± 0.1779 Sigma 0.002023 ± 0.03981

-200 0 200

400 600 800

1000 ± ± ±

(real) for eta bin 5 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 20.19 / 7 Constant 20.5±

359 Mean 0.002702 ± 0.1861 Sigma 0.002265 ± 0.03953

0

200

400

600

800 ± ±

(real) for eta bin 6 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 16.72 / 7 Constant 21.37 ± 463.8 Mean 0.002242 ± 0.186 Sigma 0.001983 ± 0.04111

0

200

400

600

800 ± ± ±

(real) for eta bin 7 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 12.15 / 7 Constant 16.4±

257.4 Mean 0.003419 ± 0.1869 Sigma 0.003084 ± 0.04576

-100 0 100 200 300 400 500 ± ±

(real) for eta bin 8 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 29.65 / 7 Constant 13.81 ± 186.6 Mean 0.006781 ± 0.1946 Sigma 0.005482 ± 0.05595

0

100

200

300

400

500 ± ± ±

(real) for eta bin 9 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 29.15 / 7 Constant 13.31 ± 99.51 Mean 0.006029 ± 0.1867 Sigma 0.004668 ± 0.03548

-50 0 50 100 150 200 250 ± ± ±

(real) for eta bin 10 γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

/ ndf

2χ 9.616 / 7 Constant 11.21 ± 92.97 Mean 0.006179 ± 0.1746 Sigma 0.005041 ± 0.04262

0 50 100 150 200 250 ± ± ±

(real) for eta bin 11 γγM

Mon Jul 7 17:52:41 2003