bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

1400

(real) for eta bin 1 γγM mInvMSpectR[0]

Entries 5879 Mean 0.3329 RMS 0.2295 / ndf

2χ 72.84 / 8 Constant 27.91±

1002 Mean 0.001146 ± 0.1488 Sigma 0.0009328 ± 0.03603

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

1400

1600

(real) for eta bin 2 γγM mInvMSpectR[1]

Entries 2758 Mean 0.2626 RMS 0.161 / ndf

2χ 47.36 / 7 Constant 29.65±

1059 Mean 0.001229 ± 0.1622 Sigma 0.001078 ± 0.03601

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

500

1000

1500

2000

(real) for eta bin 3 γγM mInvMSpectR[2]

Entries 5766 Mean 0.26 RMS 0.1502 / ndf

2χ 41.94 / 8 Constant 34.64±

1479 Mean 0.001092 ± 0.1674 Sigma 0.001019 ± 0.03737

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

1400

1600

(real) for eta bin 4 γγM mInvMSpectR[3]

Entries 4695 Mean 0.245 RMS 0.1175 / ndf

2χ 30.32 / 7 Constant 30.29±

1052 Mean 0.001407 ± 0.1691 Sigma 0.001273 ± 0.03759

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

500

1000

1500

2000

(real) for eta bin 5 γγM mInvMSpectR[4]

Entries 6530 Mean 0.2822 RMS 0.1661 / ndf

2χ 10.91 / 7 Constant 31.64±

1125 Mean 0.001682 ± 0.1756 Sigma 0.001505 ± 0.04045

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

1400

1600

(real) for eta bin 6 γγM mInvMSpectR[5]

Entries 4891 Mean 0.2523 RMS 0.1063 / ndf

2χ 32.07 / 7 Constant 27.59±

946.7 Mean 0.002181 ± 0.1771 Sigma 0.001627 ± 0.04404

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

(real) for eta bin 7 γγM mInvMSpectR[6]

Entries 4252 Mean 0.2996 RMS 0.1617 / ndf

2χ 13.03 / 7 Constant 24.21±

649 Mean 0.001987 ± 0.171 Sigma 0.001507 ± 0.03828

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

(real) for eta bin 8 γγM mInvMSpectR[7]

Entries 4469 Mean 0.2893 RMS 0.165 / ndf

2χ 22.89 / 7 Constant 24.65±

806.9 Mean 0.001864 ± 0.1741 Sigma 0.001319 ± 0.04014

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

200

400

600

800

(real) for eta bin 9 γγM mInvMSpectR[8]

Entries 2734 Mean 0.3045 RMS 0.1803 / ndf

2χ 19.14 / 7 Constant 20.34±

500.3 Mean 0.002304 ± 0.1708 Sigma 0.001777 ± 0.03895

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-100 0 100 200 300 400 500 600 (real) for eta bin 10 γγM mInvMSpectR[9]

Entries 2397 Mean 0.2675 RMS 0.1078 / ndf

2χ 13.06 / 6 Constant 15.06±

320.7 Mean 0.005966 ± 0.1778 Sigma 0.004421 ± 0.05827

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0

100

200

300

400

(real) for eta bin 11 γγM mInvMSpectR[10]

Entries 1051 Mean 0.3424 RMS 0.2011 / ndf

2χ 11.26 / 7 Constant 13.58±

172.4 Mean 0.004999 ± 0.1711 Sigma 0.003504 ± 0.04112

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0

100

200

300

400

(real) for eta bin 12 γγM mInvMSpectR[11]

Entries 1639 Mean 0.3768 RMS 0.1991 / ndf

2χ 8.166 / 6 Constant 12.84±

138.2 Mean 0.007454 ± 0.1658 Sigma 0.005314 ± 0.04801

γγM