bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-20 0 20 40 60 80

(real) for eta bin 1 γγM mInvMSpectR[0]

Entries 189 Mean -0.09391 RMS 0.3979 / ndf

2χ 32.61 / 7 Constant 7.408±

49.79 Mean 0.009559 ± 0.1051 Sigma 0.006202 ± 0.03267

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-20 0 20 40 60 80 100 (real) for eta bin 2 γγM mInvMSpectR[1]

Entries 48 Mean -0.433 RMS 0.7856 / ndf

2χ 29.81 / 7 Constant 8.366±

50.63 Mean 0.006986 ± 0.08569 Sigma 0.00349 ± 0.02049

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20 0 20 40 60 80 100

(real) for eta bin 3 γγM mInvMSpectR[2]

Entries 228 Mean -0.09639 RMS 0.437 / ndf

2χ 13.5 / 7 Constant 8.079±

62.9 Mean 0.005645 ± 0.1118 Sigma 0.003159 ± 0.03109

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20 0 20 40 60 80 100 120

(real) for eta bin 4 γγM mInvMSpectR[3]

Entries 265 Mean 0.06281 RMS 0.2252 / ndf

2χ 9.133 / 7 Constant 7.974±

63.51 Mean 0.005592 ± 0.1352 Sigma 0.00386 ± 0.03819

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -40 -20 0 20 40 60 80 100 120 140 160 180

(real) for eta bin 5 γγM mInvMSpectR[4]

Entries 486 Mean 0.01339 RMS 0.3135 / ndf

2χ 19.32 / 7 Constant 9.488±

105.2 Mean 0.003666 ± 0.1331 Sigma 0.002441 ± 0.03538

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20 0 20 40 60 80 100 120 140 160 (real) for eta bin 6 γγM mInvMSpectR[5]

Entries 307 Mean -0.01948 RMS 0.3574 / ndf

2χ 11.19 / 7 Constant 8.853± 78.75 Mean 0.004991 ± 0.1312 Sigma 0.00298 ± 0.03764

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20 0 20 40 60 80 100 120 140

(real) for eta bin 7 γγM mInvMSpectR[6]

Entries 356 Mean 0.08003 RMS 0.2327 / ndf

2χ 4.588 / 6 Constant 8.698±

62.97 Mean 0.006605 ± 0.1353 Sigma 0.005574 ± 0.04286

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20 0 20 40 60 80 100

(real) for eta bin 8 γγM mInvMSpectR[7]

Entries 325 Mean 0.152 RMS 0.1426 / ndf

2χ 8.594 / 6 Constant 7.073±

50.07 Mean 0.007305 ± 0.1424 Sigma 0.006591 ± 0.0455

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20 0 20 40 60 80 100

(real) for eta bin 9 γγM mInvMSpectR[8]

Entries 349 Mean 0.1555 RMS 0.1601 / ndf 2 χ 4.837 / 6 Constant 6.094 ± 49.68 Mean 0.02163 ± 0.1794 Sigma 0.01732 ± 0.06901

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20

0

20

40

60

80 (real) for eta bin 10 γγM mInvMSpectR[9]

Entries 123 Mean -0.0763 RMS 0.4551 / ndf

2χ 6.003 / 6 Constant 5.745±

36.22 Mean 0.01116 ± 0.1488 Sigma 0.009505 ± 0.04962

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -20

0

20

40

60

(real) for eta bin 11 γγM mInvMSpectR[10]

Entries 226 Mean 0.2366 RMS 0.1174 / ndf

2χ 9.266 / 6 Constant 5.537±

27.83 Mean 0.0125 ± 0.1594 Sigma 0.009586 ± 0.04311

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-20

0

20

40

60

(real) for eta bin 12 γγM mInvMSpectR[11]

Entries 262 Mean 0.1321 RMS 0.2251 / ndf

2χ 7.462 / 6 Constant 5.26±

36.54 Mean 0.00687 ± 0.1507 Sigma 0.006559 ± 0.04059

γγM