bins η energy distributions in γγ→ ^0π

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 20 40 60 80 100 120 140 160 180 Energy distribution (real)_{mEnergyDistR[0]}

Entries 1551 Mean 5.278 RMS 0.9043

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 20 40 60 80 100 120 140 160 180 200 220 240 Energy distribution (real)_{mEnergyDistR[1]}

Entries 1517 Mean 5.49 RMS 0.9281

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

50

100

150

200

250 Energy distribution (real)_{mEnergyDistR[2]}

Entries 1888 Mean 5.481 RMS 0.9325

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

50

100

150

200

250 Energy distribution (real)_{mEnergyDistR[3]}

Entries 1773 Mean 5.39 RMS 1.009

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 20 40 60 80 100 120 140 160 180 Energy distribution (real)_{mEnergyDistR[4]}

Entries 1428 Mean 5.43 RMS 0.9792

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 20 40 60 80 100 120 140 160 180 Energy distribution (real)_{mEnergyDistR[5]}

Entries 1363 Mean 5.389 RMS 1.003

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

20

40

60 80

100

120 Energy distribution (real)_{mEnergyDistR[6]}

Entries 914 Mean 5.517 RMS 0.9011

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

20

40

60

80

100

120 Energy distribution (real)_{mEnergyDistR[7]}

Entries 883 Mean 5.568 RMS 0.8485

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

20

40

60

80

100

Energy distribution (real)_{mEnergyDistR[8]}

Entries 778 Mean 5.58 RMS 0.894

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 20 40 60 80 100 120

Energy distribution (real)_{mEnergyDistR[9]}

Entries 878 Mean 5.52 RMS 0.8452

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

10

20

30

40

50

60 Energy distribution (real)_{mEnergyDistR[10]}

Entries 432 Mean 5.301 RMS 1.008

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 10 20 30 40 50 60 70 Energy distribution (real)_{mEnergyDistR[11]}

Entries 543 Mean 5.088 RMS 1.147

Energy distribution (real)