bins η invariant mass in γγ→ ^0π

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 20 40 60 80 100 120 140 160 (real) for eta bin 1 γγM mInvMSpectR[0]

Entries 499 Mean 0.131 RMS 0.02998 / ndf

2χ 24.36 / 7 Constant 9.525±

146.1 Mean 0.001189 ± 0.1326 Sigma 0.001194 ± 0.02577

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 20 40 60 80 100 120 140 160 180 200 220 (real) for eta bin 2 γγM mInvMSpectR[1]

Entries 629 Mean 0.1297 RMS 0.03044 / ndf

2χ 44.29 / 6 Constant 10.59±

173.2 Mean 0.001187 ± 0.1336 Sigma 0.001221 ± 0.02691

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 20 40 60 80 100 120 140 160 180 200 220 (real) for eta bin 3 γγM mInvMSpectR[2]

Entries 666 Mean 0.1323 RMS 0.02961 / ndf

2χ 29.47 / 6 Constant 9.923±

180 Mean 0.001223 ± 0.1328 Sigma 0.001091 ± 0.02816

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

50

100

150

200

250

(real) for eta bin 4 γγM mInvMSpectR[3]

Entries 800 Mean 0.1345 RMS 0.02947 / ndf

2χ 41.1 / 6 Constant 12.83±

234.7 Mean 0.0009358 ± 0.1349 Sigma 0.001049 ± 0.02561

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 50 100 150 200 250 300

(real) for eta bin 5 γγM mInvMSpectR[4]

Entries 957 Mean 0.1364 RMS 0.02899 / ndf

2χ 15.01 / 6 Constant 12.28±

284.5 Mean 0.0008731 ± 0.1345 Sigma 0.0007375 ± 0.0261

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 50 100 150 200 250 300 350 400 (real) for eta bin 6 γγM mInvMSpectR[5]

Entries 1153 Mean 0.1397 RMS 0.02688 / ndf

2χ 24.39 / 6 Constant 14.91±

371.7 Mean 0.0007272 ± 0.1396 Sigma 0.0006457 ± 0.02404

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 50 100 150 200 250 300 350 (real) for eta bin 7 γγM mInvMSpectR[6]

Entries 1039 Mean 0.1403 RMS 0.0261 / ndf

2χ 9.262 / 6 Constant 13.93±

340.3 Mean 0.0007563 ± 0.139 Sigma 0.0006321 ± 0.02389

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 50 100 150 200 250 300

(real) for eta bin 8 γγM mInvMSpectR[7]

Entries 1014 Mean 0.1399 RMS 0.02601 / ndf

2χ 17.8 / 6 Constant 13.16±

324.3 Mean 0.0008132 ± 0.1389 Sigma 0.0006157 ± 0.02432

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

50

100

150

200

250

(real) for eta bin 9 γγM mInvMSpectR[8]

Entries 854 Mean 0.1398 RMS 0.03297 / ndf

2χ 20.22 / 6 Constant 11.64±

256.6 Mean 0.0009635 ± 0.1362 Sigma 0.0007291 ± 0.02525

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

50

100

150

200

250

(real) for eta bin 10 γγM mInvMSpectR[9]

Entries 803 Mean 0.1424 RMS 0.03591 / ndf

2χ 31.47 / 6 Constant 11.91±

243.9 Mean 0.001037 ± 0.1377 Sigma 0.0007976 ± 0.02452

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 20 40 60 80 100 120 140 160 180 200 (real) for eta bin 11 γγM mInvMSpectR[10]

Entries 623 Mean 0.1421 RMS 0.03776 / ndf

2χ 42.59 / 6 Constant 10.34±

193.2 Mean 0.001236 ± 0.1355 Sigma 0.0007596 ± 0.0231

γγM

[GeV] γγM 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 20 40 60 80 100 120 140 160 180 (real) for eta bin 12 γγM mInvMSpectR[11]

Entries 554 Mean 0.142 RMS 0.03559 / ndf

2χ 26.93 / 5 Constant 9.109±

161.6 Mean 0.001347 ± 0.1384 Sigma 0.0009015 ± 0.02537

γγM