bins η energy distributions in γγ→ ^0π

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 200 400 600 800 1000

1200

1400

Energy distribution (real)_{mEnergyDistR[0]}

Entries 25643 Mean 5.541 RMS 2.37

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 200 400 600 800 1000

1200

Energy distribution (real)_{mEnergyDistR[1]}

Entries 24555 Mean 5.749 RMS 2.486

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 200 400 600 800 1000

1200

1400

Energy distribution (real)_{mEnergyDistR[2]}

Entries 30538 Mean 5.758 RMS 2.555

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

200

400

600

800

1000

Energy distribution (real)_{mEnergyDistR[3]}

Entries 22457 Mean 5.525 RMS 2.699

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

200

400

600

800

1000

Energy distribution (real)_{mEnergyDistR[4]}

Entries 26894 Mean 5.583 RMS 2.717

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0

200

400

600

800

1000

Energy distribution (real)_{mEnergyDistR[5]}

Entries 25291 Mean 5.501 RMS 2.932

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 100 200 300 400 500 600 700 800 Energy distribution (real)_{mEnergyDistR[6]}

Entries 19100 Mean 5.421 RMS 2.75

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 100 200 300 400 500 600 700 800 900 Energy distribution (real)_{mEnergyDistR[7]}

Entries 20556 Mean 5.157 RMS 2.788

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 100 200 300 400 500 600 700

Energy distribution (real)_{mEnergyDistR[8]}

Entries 14519 Mean 5.023 RMS 2.684

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 100 200 300 400 500 600 700 800 900 Energy distribution (real)_{mEnergyDistR[9]}

Entries 13790 Mean 4.686 RMS 2.809

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 100 200 300 400 500 600 700 800 Energy distribution (real)_{mEnergyDistR[10]}

Entries 9391 Mean 4.347 RMS 2.872

Energy distribution (real)

E [GeV]

0 2 4 6 8 10 12 14 16 18 20 counts

0 100 200 300 400 500 600 700 800 Energy distribution (real)_{mEnergyDistR[11]}

Entries 9983 Mean 4.324 RMS 2.766

Energy distribution (real)