x = box*192+ch

0 100 200 300 400 500 600 700 integral

0

500

1000

1500

2000

2500

3000 )σ 3.5 ± pedestal area sect=6 (ped h1[1] Entries 751 Mean 379.8 RMS 220.8

± pedestal area sect=6 (ped

x = box*192+ch

0 100 200 300 400 500 600 700 position

0 20 40 60 80 100 120 140 160 180 200 pedestal position sect=6 h2[1]

Entries 751 Mean 380 RMS 220.7

pedestal position sect=6

x = box*192+ch

0 100 200 300 400 500 600 700 σ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 Sigma of pedestal sect=6 h3[1] Entries 751 Mean 380.2 RMS 220.7

Sigma of pedestal sect=6