a05TE07 Entries 65814 Mean 0.7328 RMS 1.681

ADC-ped

-20 0 20 40 60 80 100 120

1

10

10^2

10^3

10^4

Tow R=0.00

Tower(a) 05TE07 , inclusive ADC a05PE07_{Entries 65814}

Mean 0.5049 RMS 7.408

ADC-ped

-50 0 50 100 150 200 250 300 350

1

10

10^2

10^3

10^4

a05PE07 Entries 65814

Pre1 R=0.00

Pres1(a) 05PE07 , inclusive ADC

a05QE07 Entries 65814 Mean 0.6545 RMS 9.98

ADC-ped

-50 0 50 100 150 200 250 300 350

1

10

10^2

10^3

10^4

Pre2 R=0.00

Pres2(a) 05QE07 , inclusive ADC _{a05RE07}

Entries 65814 Mean 0.513 RMS 3.808

ADC-ped

-50 0 50 100 150 200 250 300 350

1

10

10^2

10^3

10^4

a05RE07

Post R=0.00

Post(a) 05RE07 , inclusive ADC