Tue Sep 13 17:24:34 2005

ADC-ped

-20 0 20 40 60 80 100 120 a08TD09

Entries 751832 Mean 1.408 RMS 2.334

1

10 210

3 10

410

5 10 Tow R=0.72

Tower(a) 08TD09 , inclusive ADC

ADC-ped

-50 0 50 100 150 200 250 300 350 a08PD09

Entries 751832 Mean 0.2801 RMS 8.967

1 10 210

3 10 410

5 10 Pre1 R=0.58

Pres1(a) 08PD09 , inclusive ADC

ADC-ped

-50 0 50 100 150 200 250 300 350 a08QD09

Entries 751832 Mean 1.245 RMS 10.81

1 10 210

3 10

410

5 10 Pre2 R=0.65

Pres2(a) 08QD09 , inclusive ADC

ADC-ped

-50 0 50 100 150 200 250 300 350 a08RD09

Entries 751832 Mean 0 RMS 0

1 10 210

3 10 410

5 10

6 10 Post R=1.00

Post(a) 08RD09 , inclusive ADC