hTrackGlobalPtTrackGlobalPhi_f1

Entries 2288 Mean 3.206 RMS 1.776

Global track Phi angle (rad)

0 1 2 3 4 5 6 0

5

10

15

20

25 Track Global Pt Track Global Phi