hydro RHIC source hydro IPES source

-0.1 0 0.1

0 0.2 0.4 0.6 0.8

0 10 20 30 40

0 0.2 0.4 0.6 0.8

-0.1 0 0.1

0 0.2 0.4 0.6 0.8

0 10 20 30 40

0 0.2 0.4 0.6 0.8

-0.1

0

0.1

0 0.2 0.4 0.6 0.8

0 50 100

0 0.2 0.4 0.6

-0.02 0 0.02

0 0.2 0.4 0.6 0.8