R_y = 12.042 fm R_x = 12.042 fm

R_y = 13 fm R_x = 11 fm

R_y = 13.784 fm R_x = 10 fm -0.1 0 0.1 0.2

0 0.2 0.4 0.6 0.8

0 10 20 30

0 0.2 0.4 0.6 0.8

-0.2

-0.1 0 0.1

0 0.2 0.4 0.6 0.8

0 10 20 30

0 0.2 0.4 0.6 0.8

-0.1 0 0.1 0.2

0 0.2 0.4 0.6 0.8

0 50 100

0 0.2 0.4 0.6

-0.02 0 0.02

0 0.2 0.4 0.6 0.8