ρ_2 = 0.05 ρ_2 = 0.02 ρ_2 = -0.02 ρ_2 = -0.05 -0.01 0 0.01

0 0.2 0.4 0.6 0.8

0 10 20 30

0 0.2 0.4 0.6 0.8

-0.01 0 0.01

0 0.2 0.4 0.6 0.8

0 10 20 30

0 0.2 0.4 0.6 0.8

-0.01 0 0.01

0 0.2 0.4 0.6 0.8

0 50 100

0 0.2 0.4 0.6

-0.01 0 0.01

0 0.2 0.4 0.6 0.8