Sample Analyses

Events generated with Monte Carlo Models γγ STARLight backgrounds FRITIOF/VENUS/DTUNUC

Rates corrected for the geometrical acceptance of STAR

Peripheral Collisions Analysis Cuts applied

System f_2(1270) → π^+π^- ρ^0ρ^0 → π^+π^-π^+π^-η_c(2980) → K^+π^-K^-π^+

Within STAR Acceptance 380,000 9,500 33 After Analysis Cuts 300,000 8,500 30

Peripheral A+A (FRITIOF/VENUS) 400/4,000 50/460 90/680 Beam-gas (FRITIOF/VENUS) 400/1,000 6/6 <1/<1 γ+A (DTUNUC) 15,000 1,000 730

Background w/o PID 16,000/20,000 1,000/1,500 820/1,400 Background w/ PID 9/15