Conclusions

� The rates for coherent nuclear interactions at RHIC will be high.

� Many interesting physics topics can be studied in two-photon and photonuclear interactions.

� The STAR detector is well suited to study these interactions (good geometrical coverage, excellent, multi-level trigger).

� The experimental feasibility has been demonstrated through simulations of all known sources of background.