Meson Spectroscopy

Coupling to γγ can probe the quark content of mesons:

Γ_{γγ} ∝ Q_q^4 Ex. J=2 nonet Γ_{γγ} (rel.) Γ_{γγ} f_2(1270) 1/√2 | uu + dd > 25 2.8 keV

a_2(1320) 1/√2 | uu - dd > 9 1.0 keV

f_2�(1525) | ss > 2 0.1 keV For a pure glueball, Γ_{γγ} ≈ 0 Glueball Candidates: f_0(1550) ξ(2230) [f_J(2220)]