SVT Cable Description and Labels (from RDO Box to Platform)

Version Number: 1.1

Date: 30-Nov-99

Cables were strung for two Readout boxes (one on the east side, one on the west side) in the first week of Nov.99.

The labeling on the following page is for the West Side box and is representative for the labeling in general. Cables and labels were provided by Bob Minor.

We distinguish between cables from the box to the platform (one set per box), cables from the cone to the platform (one interlock cable per SVT side (east/westside), cables in the SVT racks on the platform (internal cables).

The lines in the following label scheme are lines on the label itself. Each cable has one label with a certain number of lines.

Large cables have six lines on the label. The lines on each label contain the following information:

Line 1: subsystem (SVT) Line 2: source (number of RDO box) Line 3: cable type (e.g. LV or HV, etc.)

Line 4: destination (e.g. SVT-Rack or CAL-DC, etc.) Line 5: location (e.g. 1C4/8) Line 6: connector (e.g. W12-J-2)

Smaller Cables combine the sub system and cable type information into one line, and the destination and location into one line).

Cable Type Label Line 1 Line 2 Line 3 Line 4 Line 5 Line 6 HV (RG-59) SVT-HVH-1 RDO-W12 1C5/21 J- FV (RG-59) SVT-HVL-1 RDO-W12 1C5/21 J- HDLC 1 (4pair)

(Alpha6392) SVT-HDLC RDO-W12 1 C2/31 W12-J- HDLC 2 (4pair)

(Alpha6392) SVT RDO-W12 HDLC-X HDLC-X Cal-Pulser (RG-59) SVT RDO-W12 CAL-PLS 1C2/22 W12-J- CAL-DC (RG-59) SVT RDO-W12 CAL-DC 1C2/22 W12-J- Clk-Trig (13pair) (Belden9M28126) VT-CLK/TRI RDO-W12 TRIG-RACK 1A2/ W12-J- LV-1 (?) SVT RDO-W12 LV-PWR SVT-RACK 1C4/8 W12-J- LV-2 (?) SVT RDO-W12 LV-EXT TRAY LV-EXT Ground

(?) SVT RDO-W12 GROUND MAGNET WEST GROUND

Table 1. Cables from Box to Platform

Cone Interlock (13pair)

(Belden9M28126) SVT RDO-W CONE-INT SVT-RACK 1C2/6 BLK

Table 2. Cables from Cone to Platform

LV Supply Interlock

(?) SVT-RACK 1C4/8-1 LV-PS-INT SVT-RACK 1C2/6 BLK Supply Control

(?) SVT-RACK 1C2/31-P2 PS-CNTL SVT-RACK 1C2/6 BLK HV Supply Interlock

(?) SVT-RACK 1C5/21-INT HV-INT SVT-RACK 1C2/6 BLK Air Interlock

(?) SVT-AIR J- AIR-INT SVT-RACK 1C2/6 BLK

Table 3. Cables on Platform (SVT internal)

2