0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 200 400 600 800 1000

1200

1400

1600 ff4 Nent = 5682 Mean = 1.276 RMS = 0.3027

Run 1028036,Sector 1 ff4