# of Tracks after Cuts

30 40 50 60 70 80

Processing Time (ms)

2 3 4 5 6 7 8 9 10 11

Intel Pentium III - 600MHz

Alpha 21264 - 466 MHz

Global-L3 invariant mass algorithm timing