Axial Position (m)

Radial Magnetic Field (Gauss)

R = 200 cm

130 cm

60 cm

-50 -40 -30 -20 -10 0 10 20 30 40 50

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2