Drift Distance (m)

Radial Field Integral (cm)

R = 200 cm 130 cm 60 cm

-0.3

-0.2

-0.1 0 0.1 0.2 0.3

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2