0 100 200 300

0 1000 2000 3000

1 GeV

0 100 200 300 400

0 50 100 150 200

1 GeV

0 100 200 300 400

1000 2000 3000

3 GeV

0 100 200 300 400

0 50 100 150 200

3 GeV

0 100 200 300

0 1000 2000

Cluster signal (ADC) Energy (keV)

Counts

5 GeV

0 100 200 300 400

0 50 100 150 200

5 GeV