Theta Cherenkov (rad)

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75

Entries / 0.006 rad

0 20 40 60 80 100 120 140 160 180 200 Nent = 1389

Negatives

1.73 < pt < 1.89 GeV/c

Nent = 1389