20 40 60 80 100 120 140 160 180 0

200

400

600

800

1000

1200

1400

Chi2 / ndf = 1817 / 76 Constant = 8156 +- 95.98 Mean = 40.06 +- 0.0801 Sigma = 4.304 +- 0.04056

S/N P side

0 20 40 60 80 100 120 0

200

400

600

800

1000

Chi2 / ndf = 1144 / 77 Constant = 5870 +- 76.18 Mean = 28.55 +- 0.06267 Sigma = 3.143 +- 0.03192

S/N N side