full VPD

Entries Mean RMS 97 0.1175 1.522 Constant 8.687 Mean 0.5940E-01 Sigma 1.692

cm four PMT per side

Entries Mean RMS 95 -0.6105E-01 1.496 Constant 9.553 Mean 0.5114E-01 Sigma 1.464

cm

two PMT per side

Entries Mean RMS 89 -0.5618E-01 1.607 Constant 8.057 Mean -0.9841E-01 Sigma 1.663

cm Z. Milosevich CMU 8/96

0 2 4 6 8 10 12

-5 -2.5 0 2.5 5 0

2

4

6

8

10

12

-5 -2.5 0 2.5 5

0

2

4

6

8

10

12

-5 -2.5 0 2.5 5