Channel 0

Channel 7

Configuration Memory

Configuration PROM

FIFO Output Memory

Computational FPGA

Look-Up Table

Input Buffer

Input Register

Input Memory

Input Data CH 0

Look-Up Table

Input Buffer

Input Register

Input Data CH 7

Input Memory DSM Output

128 bits 32 bits

16 bits

16 bits