1

4

7

10

13

16

19

22

25

28

31

34

37

10

100

1000

10000

ADC channel (ndata = 500) counts

Tray 57 -S1 data

1

4

7

10

13

16

19

22

25

28

31

34

37

10

100

1000

10000

ADC channel (ndata = 500) counts

Tray 58 -S1 data

1

4

7

10

13

16

19

22

25

28

31

34

37

10

100

1000

10000

ADC channel (ndata = 500) counts

Tray 59 -S1 data

1

4

7

10

13

16

19

22

25

28

31

34

37

10

100

1000

10000

ADC channel (ndata = 500) counts

Tray 91 -S1 data

1

4

7

10

13

16

19

22

25

28

31

34

37

10

100

1000

10000

ADC channel (ndata = 500) counts

Tray 92 -S1 data

1

4

7

10

13

16

19

22

25

28

31

34

37

10

100

1000

10000

ADC channel (ndata = 500) counts

Tray 93 -S1 data

User = "crawford", date = "Thu Jan 27 18:47:41 2000", input file = "/tmp/monitor/adc.plot".

WARNING: plot produced with -i option, may be missing points.