0 20 40 60 80 100 120

1

10

10^2

10^3

10^4

htemp Nent = 10000 Mean = 7.449 RMS = 7.744

HItime_{htemp}

15 20 25 30 35 40 45 50

1

10

10^2

10^3

htemp Nent = 10000 Mean = 16 RMS = 3.599

readTime_{htemp}

100 150 200 250 300 350 400 450

1

10

10^2

10^3

10^4

htemp Nent = 10000 Mean = 132.1 RMS = 46.16

TotTime_{htemp}

L1 Times pre/post=0, CTB MWC BEMC