(GeV/c)

T p×q

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Fraction (%)

0 10 20 30 40 50 60 70 80 90 100 <0.2 η 0< -π^+π -K^+K p p -e^+e