0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 -3 x10 -0.05

0

0.05

0.1

0.15 htemp Nent = 4400 Mean = 0.0002 RMS = 0.0001154

mean:x {y>24} htemp