Track Length (cm)

20 40 60 80 100 120 140 160

70)/I 70(Iσ

Resolution

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

30% truncation versus track length, Y2001 data, No corrections