20 40 60 80 100 120 140 160

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

TPoints70SigmaFG Nent = 0 Mean = 56.26 RMS = 32.37 Chi2 / ndf = 0 / -2 1.414 ± p0 = 0.64 1.414 ± p1 = 0.5

Sigma of z versus no. of measurement points TPoints70SigmaFG

± ±