-0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0 5000

10000

15000

20000

25000

30000

35000 bin Nent = 147 Mean = 0.005833 RMS = 0.09279 Chi2 / ndf = 5.559e+04 / 143 50.71 ± Constant = 3.657e+04 9.812e-05 ± Mean = 0.003816 7.439e-05 ± Sigma = 0.089 zFit - log(I(pi)) versus log10(p_glob/m) bin

± ± ±