1

10

10^2

10^3

(GeV/c)

T p×q

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

(dE/dx) (keV/cm) 10 log

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 dedx Nent = 811504 Mean x = 0.01049 Mean y = 0.1863 RMS x = 0.6467 RMS y = 0.1276

< 0.2 η for 0 < T dE/dx (keV/cm, 30% truncation) versus p dedx