-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0 1000

2000

3000

4000

5000

6000

7000

8000

9000 pNz_30 Nent = 155 Mean = -0.6944 RMS = 0.3281 Chi2 / ndf = 481.5 / 79 11.49 ± Constant = 1778 0.0004516 ± Mean = -0.01316 0.000369 ± Sigma = 0.08999 zFit - log(I(p)) versus log10(p_glob/m) pNz_30

± ± ±