-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0 10000

20000

30000

40000

50000

60000

70000

80000 pNz_42 Nent = 188 Mean = -0.3685 RMS = 0.1462 Chi2 / ndf = 967.2 / 65 25.92 ± Constant1 = 8347 0.0002735 ± Mean1 = -0.007513 0.0002327 ± Sigma1 = 0.08733 2171 ± Constant2 = 1.317e+05 0.0008876 ± Mean2 = -0.4631 0.0001937 ± Sigma2 = 0.104

zFit - log(I(p)) versus log10(p_glob/m) pNz_42

± ± ± ± ± ±