-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0

2000

4000

6000

8000

10000

1 x10 piNz_63 Nent = 153 Mean = 0.0428 RMS = 0.1554 Chi2 / ndf = 1628 / 94 89.64 ± Constant1 = 1.125e+05 5.615e-05 ± Mean1 = 0.006824 4.232e-05 ± Sigma1 = 0.08739 20.4 ± Constant2 = 8844 0.0002097 ± Mean2 = 0.4958 1.372e-05 ± Sigma2 = 0.08668 zFit - log(I(pi)) versus log10(p_glob/m) piNz_63

± ± ± ± ± ±