-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 0 10000

20000

30000

40000

50000

60000

70000

80000

90000 piNz_75 Nent = 152 Mean = 0.04751 RMS = 0.1455 Chi2 / ndf = 1301 / 113 80.21 ± Constant1 = 8.547e+04 6.568e-05 ± Mean1 = 0.009856 5.126e-05 ± Sigma1 = 0.08473 24.82 ± Constant2 = 8116 0.0002635 ± Mean2 = 0.4094 0.0002228 ± Sigma2 = 0.0914 zFit - log(I(pi)) versus log10(p_glob/m) piNz_75

± ± ± ± ± ±