Track Length (cm)

20 40 60 80 100 120 140 160

Resolution

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

TPointsSigmaFG Nent = 0 Mean = 52.92 RMS = 29.38 Chi2 / ndf = 229.1 / 79 0.01551 ± p0 = 1.203 0.003123 ± p1 = -0.5832

Sigma for fitted log(dE/dx) versus Track Length (uncorected) TPointsSigmaFG

± ±