1.5 1.7 1.9 2.1 2.3 2.5

Γ(W) (GeV)

5 7 Theory, 95Ψ UA1 UA2 CDF 89 CDF 89

CDF 1A DØ 1A DØ 1A DØ 1B DØ 1B CDF 93, Direct 1A

World Average

Muon Electron