Run 1b Z 5 ee Sample

Z Invariant Mass GeV

Events per GeV

5705 candidates Lum ~ 89 pb^{-1}

DØ Preliminary

0

100

200

300

400

500

600

700

800

50 60 70 80 90 100 110 120 130