Run 1b W 5 eν Sample

W Transverse Mass GeV

Events per GeV

59579 candidates Lum ~ 76 pb^{-1}

DØ Preliminary

0

500

1000

1500

2000

2500

30 40 50 60 70 80 90 100 110 120