79 79.5 80 80.5 81 81.5

5 7 LEP,SLD Indirect Prediction

CDF (1990) UA2 (1992) CDF (1A) D0 (1A) D0 (1B) - Prelim CDF (1B)

World (not LEP2)

65 MeV common error

DELPHI - Prelim L3 - Prelim OPAL - Prelim ALEPH - Prelim

LEP2(161)

LEP2(172) - Prelim

M_W = 79.91 ± 0.39 M_W = 80.37 ± 0.37 M_W = 80.41 ± 0.18 M_W = 80.35 ± 0.27 M_W = 80.38 ± 0.17 M_W = 80.43 ± 0.16

M_W = 80.37 ± 0.10

M_W = 80.14 ± 0.29 M_W = 80.70 ± 0.40 M_W = 80.26 ± 0.28 M_W = 80.23 ± 0.25

M_W = 80.42 ± 0.22

M_W = 80.37 ± 0.19

M_W (GeV/c^2)