79.8 80 80.2

80.4

80.6

80.8 81 81.2

140 160 180 200 220 240 m_{top} (GeV/c^2) m_W (GeV/c^2)

DØ

M_W = 80.44 ± 0.11 GeV m_{top} = 172.0 ± 7.5 GeV