100 300

1000

Higgs Mass (GeV/c^2)

M_{top} (GeV/c^2)

M_W (GeV/c^2)

DØ

DØ: M_W = 80.37 ± 0.15 GeV/c^2 M_t = 173.3 ± 8.4 GeV/c^2

World

World Average: M_W = 80.37 ± 0.10 GeV/c^2 M_t = 175.6 ± 5.5 GeV/c^2